This specification is provided under the
\href{https://www.oasis-open.org/policies-guidelines/ipr#Non-Assertion-Mode}{Non-Assertion} Mode of the
\href{https://www.oasis-open.org/policies-guidelines/ipr}{OASIS IPR Policy}, the
mode chosen when the Technical Committee was established. For information on
whether any patents have been disclosed that may be essential to implementing
this specification, and any offers of patent licensing terms, please refer to
the Intellectual Property Rights section of the TC's web page
(\url{https://github.com/oasis-tcs/virtio-admin/blob/master/IPR.md}).
