%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% Commands for the CMIS specification document
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\definecolor{oasis1}{RGB}{85,38,129}
\definecolor{oasis2}{RGB}{227,175,27}
\definecolor{shadecolor}{RGB}{230,230,230}
\definecolor{erratagreen}{RGB}{44,127,0}
